% This is ref-report-macros.tex
%
% Document Type: LaTeX 2.09
 
%%%% The page size
\setlength{\oddsidemargin}{-6mm}
\setlength{\textwidth}{169mm}
\setlength{\textheight}{235mm} 	
\setlength{\topmargin}{-3mm}	
\setlength{\headsep}{-2mm}
 
\newcommand{\refbox}[1]{{\setlength{\unitlength}{1ex}\begin{picture}(4,3)(0,0)
		\put(0,0){\framebox(4.2,3.2){#1}}
		\end{picture}}}
 
\newcommand{\PaperNumber}[1]{\noindent{\bf Paper Number:\ } {#1} \vspace{1ex}\newline}
\newcommand{\Title}[1]{\noindent{\bf Title:} {#1} \vspace{1ex}\newline}
\newcommand{\Authors}[1]{\noindent{\bf Author(s):} {#1} \vspace{1ex}\newline
	\rule{\textwidth}{.01in}}
 
\newcommand{\Accuracy}[1]{\noindent Please rate the following qualities from
		0 to 10, with 10 being the highest.\\[2ex]
		\noindent\parbox{2.3in}{{\bf Technical accuracy:}
		\hfill\refbox{#1}} \vspace{1ex}\newline}
\newcommand{\Significance}[1]{\noindent\parbox{2.3in}{{\bf Significance of the work:}
		\hfill\refbox{#1}} \vspace{1ex}\newline}
\newcommand{\Originality}[1]{\noindent\parbox{2.3in}{{\bf Originality of the work:}
		\hfill\refbox{#1}} \vspace{1ex}\newline}
\newcommand{\Presentation}[1]{\noindent\parbox{2.3in}{
		{\bf Quality of presentation:}
		\hfill\refbox{#1}} \vspace{1ex}\newline}
\newcommand{\Appropriateness}[1]{\noindent\parbox{2.3in}{{\bf Appropriateness:}
		\hfill\refbox{#1}} }
\newcommand{\Overall}[1]{\hspace*{85mm}\parbox{79mm}{\vspace*{-40mm}
  	{\bf Overall evaluation of the paper:}
			\hfill\refbox{\bf #1}\\[2ex]
			\mbox{}[10 -- 8] : strong accept \\
                        \mbox{}[~7 -- 6] : weak accept   \\
                        \mbox{}[~5 -- 4] : weak reject   \\
                        \mbox{}[~3 -- 1] : strong reject \\
                        0  -- outside the scope of ITALLC96}\\
		\rule{\textwidth}{.01in}}
\newcommand{\Confidence}[1]{\noindent\parbox{2.3in}{{\bf Referee's 
		       confidence \\
		       in the evaluation:}\hfill\refbox{#1}}\hspace{15ex}}
\newcommand{\OverallPC}[1]{\noindent\parbox{79mm}{{\bf Overall
			evaluation by the PC\\ member (if
			different from reviewer):}\hfill\refbox{#1}}\\
			\rule{\textwidth}{.01in}}
 
\newenvironment{Justification}{\newline\noindent{\bf Justification}
			(why you rate the paper as above):
			\newline}{~\newline}
\newenvironment{Recommendation}{\noindent{\bf Recommendation to the author(s)
			for possible improvements:}
			\newline}{~\newline}
 
\newenvironment{ToProgramCommittee}{\newline\noindent{\bf Confidential
			comments to the PC but
			{\bf not} for author(s):\\[1ex]}}{}
 
\newcommand{\CommitteeMember}[1]{\noindent\rule{\textwidth}{.01in}\\
			{\bf Below this line are confidential 
			comments NOT communicated to the authors}
			\newline\rule{\textwidth}{.01in}\\
			\noindent{\bf Name of committee member: }{#1} 
			\vspace{1ex}\newline}
\newcommand{\Reviewer}[1]{\noindent{\bf Name of reviewer (if different):}
			{#1} \vspace{1ex}}
 
\newenvironment{RefReport}{
	\newpage
	\font\tencmssdc=cmssdc10 scaled \magstep4
	\newfam\cmssdcfam
	\textfont\cmssdcfam=\tencmssdc
	\def\cmssdc{\fam\cmssdcfam\tencmssdc}
 
	\hspace{-15mm}
	\begin{minipage}{45mm}
	\begin{flushleft}
  	{\huge ITALLC96}\\
	{\bf July 18-21, 1996\\
	Regent's College, London}
	\end{flushleft}\end{minipage}\hfill
	{\LARGE {\sf Referee Report Form}}\\[5mm]
	}{}
 
\pagestyle{empty}
 
%%%%% END OF MACROS
