Matlab1 Matrix Printout from emily

Columns 1 144 Rows 1

144 1.3e-04

5.7e-01

Input Min: 1.3e-04 at ( 1, 144) Input Max: 5.7e-01 at ( 67, 67)

Values on color bar and printout are scaled values which are NOT the same as the input values.